Menu files can have any name but must end with .mnu
Help files can have any name but must end with .hlp

Menu files consist of up to 5 lines where each line looks like:
filename.mnu:up to 50 characters of description
filename.hlp:up to 50 characters of description
.pg
Help files are text files where each line doesn't exceed 70 
     characters in length (do NOT use tabs).
Help files are displayed 10 lines at a time.
Page breaks may be created with .pg in the leftmost column.
A help file can have a maximum of 5 pages.
A .end in the leftmost column can optionally end a help file.
The last line may end without a carrage return line feed (CRLF). 
